Data

Rope

Pipe

Swing

DIPSY 0 2000000

4000000

6000000

8000000

10000000

12000000

14000000K^−/K^+ ratio at √ s = 7 TeV (0.0 < p_⊥ < 0.8 GeV/c)

K^−/K^+33.23.43.63.844.24.40.60.811.21.4η MC/Data