Data

Rope

Pipe

Swing

DIPSY 10^{−5}

10^{−4}

10^{−3}

10^{−2}

10^{−1}Ξ^− transverse momentum distribution at √ s = 0.9 TeV

(1/N_{NSD}) dN/dp_T (GeV/c)^{−1}01234560.60.811.21.4

Ξ^− p_T [GeV/c]MC/Data