Data

Rope

Pipe

Swing

DIPSY 0 100000

200000

300000

400000

500000

600000

700000

800000

900000(p + p̄)/(K^+ + K^−) ratio at √ s = 0.9 TeV (p_⊥ > 1.2 GeV/c)

(p + p̄)/(K^+ + K^−)2.533.544.50.60.811.21.4ηMC/Data